-3 -2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

sin(2β)

Charmonium Modes ϕK^0_S η^,K^0_S KKK^0_S

OPAL 98 ALEPH 00 CDF 00 BABAR 02 Belle 02 Average (charmonium) BABAR 02 Belle 03 BABAR 03 Belle 03 Belle 03 Average (s penguin) Average (All)

3.2^{+ 1.8}_{– 2.0} Α0.5 0.84^{+ 0.82}_{– 1.04} Α0.16 0.79^{+ 0.41}_{– 0.44} 0.741Α0.067Α0.034 0.719Α0.074Α0.035 0.734Α0.055 –0.18Α0.51Α0.07 –0.73Α0.64Α0.22 0.02Α0.34Α0.03 0.71Α0.37^{+ 0.05}_{– 0.06} 0.49Α0.43^{+ 0.35}_{– 0.11} 0.19Α0.20

0.699Α0.054

0.19Α0.2 HFAG

Winter 2003