-2 -1.5 -1 -0.5 0 0.5 C_{ππ}

Average Winter 03

BABAR (Summer 2002)

Belle (Winter 2003)

Average (Winter 2003)

–0.3Α0.25

–0.77Α0.28

–0.48Α0.19

-0.48Α0.19

HFAG

Winter 2003