D_K^(_π^*_π^)K^{(*)} y_- Averages

HFAG

LP 2009

HFAG

LP 2009

HFAG

LP 2009

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRD 78 (2008) 034023

0.053 Α 0.056 Α 0.007 Α 0.015

Belle

arXiv:0803.3375

0.177 Α 0.060 Α 0.018 Α 0.054

Average

HFAG correlated average

0.111 Α 0.042

BaBar

PRD 78 (2008) 034023

-0.051 Α 0.080 Α 0.009 Α 0.010

Belle

arXiv:0803.3375

-0.249 Α 0.118 Α 0.049

Average

HFAG correlated average

-0.119 Α 0.066

BaBar

PRD 78 (2008) 034023

0.226 Α 0.142 Α 0.058 Α 0.011

Belle

PRD 73, 112009 (2006)

-0.281 ^+_-^0^.^4_3^4_3^0_5 Α 0.046 Α 0.086

Average

HFAG correlated average

0.161 Α 0.143

HFAG

LP 2009

PRELIMINARY