D_K^(_π^*_π^)K^{(*)} x_- Averages

HFAG

LP 2009

HFAG

LP 2009

HFAG

LP 2009

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

PRD 78 (2008) 034023

0.090 Α 0.043 Α 0.015 Α 0.011

Belle

arXiv:0803.3375

0.105 Α 0.047 Α 0.011 Α 0.064

Average

HFAG correlated average

0.104 Α 0.033

BaBar

PRD 78 (2008) 034023

-0.111 Α 0.069 Α 0.014 Α 0.004

Belle

arXiv:0803.3375

-0.036 Α 0.127 Α 0.090

Average

HFAG correlated average

-0.082 Α 0.061

BaBar

PRD 78 (2008) 034023

0.115 Α 0.138 Α 0.039 Α 0.014

Belle

PRD 73, 112009 (2006)

-0.784 ^+_-^0^.^2^4_9^9_5 Α 0.029 Α 0.097

Average

HFAG correlated average

-0.097 Α 0.127

HFAG

LP 2009

PRELIMINARY