Merged B5D*K x+

HFAG

LP 2009

D*_Dalitz K

D*_{CP} K

B5D*K -0.4 -0.2 0 0.2 0.4

BaBar

PRD 78 (2008) 034023

0.137 Α 0.068 Α 0.014

Belle

arXiv:0803.3375

0.083 Α 0.092

BaBar

PRD 78, 092002 (2008)

0.110 Α 0.060 Α 0.020

Average

HFAG

0.114 Α 0.042

HFAG

LP 2009 PRELIMINARY