Merged B5DkStar x-

HFAG

Beauty 2009

D_Dalitz K*

D_{CP} K*

B5DkStar -0.4 -0.2 0 0.2 0.4

BaBar

PRD 78 (2008) 034023

0.115 Α 0.138 Α 0.039

Belle

PRD 73, 112009 (2006)

-0.784 ^+_-^0^.^2^4_9^9_5 Α 0.029

BaBar

arXiv:0909.3981

0.400 Α 0.140 Α 0.050

Average

HFAG

0.102 Α 0.095

HFAG

Beauty 2009 PRELIMINARY