J/ψ π^0 C_{CP}

HFAG

LP 2007

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4

BaBar

PRD 74 011101 (2006)

-0.21 Α 0.26 Α 0.06

Belle

arXiv:0708.0304

-0.08 Α 0.16 Α 0.05

Average

HFAG correlated average

-0.12 Α 0.14

HFAG

LP 2007 PRELIMINARY