D_D^(_a^*_l^)_{itz}K^{(*)} x_+ Averages

HFAG

FPCP 2010

HFAG

FPCP 2010

HFAG

FPCP 2010

D_Dalitz K D*_Dalitz K D_Dalitz K*

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

BaBar

arXiv:1005.1096

-0.103 Α 0.037 Α 0.006

Belle

PRD 81 (2010) 112002

-0.107 Α 0.043 Α 0.011

Average

HFAG correlated average

-0.104 Α 0.029

BaBar

arXiv:1005.1096

0.147 Α 0.053 Α 0.017

Belle

PRD 81 (2010) 112002

0.083 Α 0.092

Average

HFAG correlated average

0.130 Α 0.048

BaBar

arXiv:1005.1096

-0.151 Α 0.083 Α 0.029

Belle

PRD 73, 112009 (2006)

-0.105 ^+_-^0^.^1^7_6^7 Α 0.006

Average

HFAG correlated average

-0.152 Α 0.077

HFAG

FPCP 2010

PRELIMINARY