ρ^+ ρ^- S_{CP}

HFAG

LP 2007

-0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

BaBar

PRD 76 (2007) 052007

-0.17 Α 0.20 ^+_-^0^.^0^5_6

Belle

PRD 76 (2007) 011104

0.19 Α 0.30 Α 0.07

Average

HFAG correlated average

-0.05 Α 0.17

HFAG

LP 2007 PRELIMINARY