ρ^+ ρ^- C_{CP}

HFAG

LP 2007

-0.6 -0.4 -0.2 0 0.2 0.4

BaBar

PRD 76 (2007) 052007

0.01 Α 0.15 Α 0.06

Belle

PRD 76 (2007) 011104

-0.16 Α 0.21 Α 0.07

Average

HFAG correlated average

-0.06 Α 0.13

HFAG

LP 2007 PRELIMINARY