π^+ π^- C_{CP}

HFAG

ICHEP 2008

-0.7 -0.6 -0.5 -0.4 -0.3 -0.2 -0.1

BaBar

arXiv:0807.4226

-0.25 Α 0.08 Α 0.02

Belle

PRL 98 (2007) 211801

-0.55 Α 0.08 Α 0.05

Average

HFAG correlated average

-0.38 Α 0.06

HFAG

ICHEP 2008 PRELIMINARY