Merged B5D*K x-

HFAG

FPCP 2010

D*_Dalitz K

B5D*K

-0.4 -0.2 0 0.2 0.4

BaBar

arXiv:1005.1096

-0.104 Α 0.051 Α 0.019

Belle

PRD 81 (2010) 112002

-0.036 Α 0.127

Average

HFAG

-0.093 Α 0.050

HFAG

FPCP 2010 PRELIMINARY