D^+ D^- S_{CP}

HFAG

Winter 2009

-2.4 -2.2 -2 -1.8 -1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8

BaBar

PRD 79, 032002 (2009)

-0.65 Α 0.36 Α 0.05

Belle

PRL 98, 221802 (2007)

-1.13 Α 0.37 Α 0.09

Average

HFAG correlated average

-0.89 Α 0.26

HFAG

Winter 2009 PRELIMINARY