A_{ADS} Averages

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

HFAG

Beauty 2009

D_Kπ K D*_Dπ^0_Kπ K

D*_Dγ_Kπ K D_Kπ K* D_Kπ π

-2 -1 0 1

BaBar

EPS 2009 preliminary

-0.70 Α 0.35 ^+_-^0^.^0_1^9_4

Belle

PRD 78 (2008) 071901

-0.13 ^+_-^0^.^9_8^7_8 Α 0.26

Average

HFAG

-0.62 Α 0.34

BaBar

EPS 2009 preliminary

0.77 Α 0.35 Α 0.12

Average

HFAG

0.77 Α 0.37

BaBar

EPS 2009 preliminary

0.36 Α 0.94 ^+_-^0^.^2_4^5_1

Average

HFAG

0.36 ^+_-^0_1^.^9_0^7_3

BaBar

arXiv:0909.3981

-0.34 Α 0.43 Α 0.16

Average

HFAG

-0.34 Α 0.46

Belle

PRD 78 (2008) 071901

-0.02 Α 0.22 Α 0.07

Average

HFAG

-0.02 Α 0.23

HFAG

Beauty 2009 PRELIMINARY