β ( ϕ_1

ρ^– η^–

-0.2 0 0.2 0.4 0.6 0.8 1

-0.2 0 0.2 0.4 0.6 0.8 1 β ( ϕ_1 = (21.3 Α 1.0)˚ β ( ϕ_1 = (68.7 Α 1.0)˚

HFAG

Moriond 2007 PRELIMINARY