Home Configuration Network Serial Ports Users Security System Applications PPP Industrial Automation Management Serial Ports Connections Power Administration Backup/Restore Update Firmware Factory Default Settings Device Information Reboot Logout

Enable Port Description Profile Serial Configuration Action

ioc-fee-homs (701) Printer Copy... ioc-fee-popin-1 (712) Printer Copy... ioc-fee-popin-2 (722) Printer Copy... plc-fee-vac-mirr (703) Printer Copy... None <Unassigned> Copy... None <Unassigned> Copy... VGC:FEE1:702 MKS-937A Printer Copy... VGC:FEE1:703 MKS-937A Printer Copy... VGC:FEE1:704 MKS-937A Printer Copy... VPC:FEE1:702 Gamma-2-100 Printer Copy... VPC:FEE1:703 Gamma-2-100 Printer Copy... VPC:FEE1:704 Gamma-2-100 Printer Copy... None <Unassigned> Copy... None <Unassigned> Copy... None <Unassigned> Copy... None <Unassigned> Copy...

Apply