E155 systematic error at Q^2=5 GeV^2

E155 E143 SMC Hermes

December 1998

Preliminary

xg_1^p

E155 systematic error at Q^2=5 GeV^2

E155 E143 SMC xg_1^d

E155 systematic error at Q^2=5 GeV^2

E155 E154 Hermes

xg_1^n

x_{Bj}

E155 NLO Fit

0

0.05

10^{-2} 10^{-1}

0

0.02

10^{-2} 10^{-1}

-0.025

0

0.025

10^{-2} 10^{-1}