π^0 π^0 K_S S_{CP}

HFLAV

Summer 2018

-2 -1 0 1 2 3

BaBar

PRD 76 (2007) 071101

-0.72 Α 0.71 Α 0.08

Belle

PR D99 (2019) 011102

0.92 ^+_-^0^.^2_3^7_1 Α 0.11

Average

HFLAV correlated average

0.66 Α 0.28

HFLAV

Summer 2018 PRELIMINARY