sin(2β) ( sin(2ϕ_1)

HFAG

Beauty 2011

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

BaBar PRD 79 (2009) 072009

0.687 Α 0.028 Α 0.012

BaBar χ_{c0} K_S PRD 80 (2009) 112001

0.690 Α 0.520 Α 0.040 Α 0.070

BaBar J/ψ (hadronic) K_S PRD 69 (2004) 052001

1.560 Α 0.420 Α 0.210

Belle Moriond EW 2011 preliminary

0.668 Α 0.023 Α 0.013

Average HFAG

0.678 Α 0.020

HFAG

Beauty 2011 PRELIMINARY