SLAC-R-633

Architectures and Algorithms for Control and Diagnostics of Coupled-Bunch Instabilities in Circular Accelerators^∗

Dmitry Teytelman

Stanford Linear Accelerator Center Stanford University Stanford, CA 94309

SLAC-Report-633 June 2003

Prepared for the Department of Energy under contract number DE-AC03-76SF00515

Printed in the United States of America. Available from the National Technical Information Service, U.S. Department of Commerce, 5285 Port Royal Road, Springfield, VA 22161.

∗Ph.D. thesis, Stanford University, Stanford, CA 94309.