SLAC-PUB-7809April 1998 Millimeter-Wave Drivers for Future Linear CollidersDavid H. WhittumStanford Linear Accelerator Center, Stanford University, Stanford California, 94309AbstractThe challenges for high-gradient mm-wave driven colliders are reviewed.Requirements on power sources are examined, and a particular tube is considered forillustration. Research topics relevant to a compact 1 GeV linac are noted throughout.Extended Abstract for Invited Talk at the 22nd International Conference on Infraredand Millimeter WavesWintergreen, Virginia, 20-25 July 1997(Work supported by Department of Energy contract DE-AC03-76SF00515)