1

Table I. Cross sections for inelastic electron scattering from protons for SLAC experiment NE11. The errors shown include statistical and point-to-point systematic uncertainties added in quadrature, but do not include an overall normalization error of about 1.8%. Also shown are RC, the applied multiplicative radiative corrections to the raw cross sections after elastic tail subtraction, and RT, the subtracted elastic radiative tail.

E^′ Q^2 ϵ RC RT dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV) (nb/sr-GeV)

E = 5.507 GeV θ = 15.146^∘

4.437 1.698 0.944 1.82 7.58 4.21 ± 1.04 4.429 1.694 0.944 1.73 7.20 4.85 ± 1.06 4.420 1.691 0.943 1.68 6.86 5.86 ± 1.08 4.411 1.687 0.943 1.64 6.57 8.76 ± 1.13 4.402 1.684 0.943 1.62 6.3 12.1 ± 1.2 4.393 1.681 0.942 1.60 6.0 15.4 ± 1.2 4.384 1.677 0.942 1.59 5.8 17.5 ± 1.3 4.375 1.674 0.941 1.58 5.6 22.5 ± 1.4 4.367 1.670 0.941 1.57 5.4 26.4 ± 1.5 4.358 1.667 0.940 1.56 5.3 32.9 ± 1.6 4.349 1.664 0.940 1.56 5.1 37.6 ± 1.7 4.340 1.660 0.940 1.55 5.0 48.5 ± 1.9 4.331 1.657 0.939 1.53 4.8 56.1 ± 2.0 4.322 1.654 0.939 1.51 4.7 62.2 ± 2.1 4.313 1.650 0.938 1.49 4.6 64.3 ± 2.1 4.304 1.647 0.938 1.45 4.5 68.1 ± 2.2 4.296 1.643 0.937 1.42 4.4 65.7 ± 2.1 4.287 1.640 0.937 1.38 4.3 63.6 ± 2.1 4.278 1.637 0.936 1.35 4.2 58.4 ± 2.1 4.269 1.633 0.936 1.31 4.1 57.1 ± 2.1 4.260 1.630 0.935 1.29 4.0 54.6 ± 2.1 4.252 1.626 0.935 1.26 4.0 50.3 ± 2.2 4.243 1.623 0.934 1.24 3.9 48.0 ± 2.3 4.234 1.620 0.934 1.23 3.8 52.1 ± 2.7 4.225 1.616 0.933 1.22 3.8 48.1 ± 2.9 4.216 1.613 0.933 1.21 3.7 45.8 ± 3.6 4.207 1.610 0.932 1.20 3.7 46.4 ± 4.7 4.198 1.606 0.932 1.19 3.6 50.8 ± 9.2

2

Table I. Continued.

E^′ Q^2 ϵ RC RT dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV) (nb/sr-GeV)

E = 5.507 GeV θ = 18.981^∘

4.060 2.431 0.906 2.10 1.450 0.549 ± 0.144 4.048 2.424 0.905 1.80 1.337 0.814 ± 0.129 4.035 2.417 0.904 1.70 1.24 1.21 ± 0.13 4.024 2.409 0.903 1.64 1.17 1.76 ± 0.14 4.011 2.402 0.903 1.61 1.10 2.13 ± 0.15 3.999 2.395 0.902 1.59 1.04 2.94 ± 0.18 3.987 2.388 0.901 1.58 0.99 4.20 ± 0.20 3.975 2.380 0.900 1.57 0.95 6.19 ± 0.23 3.963 2.373 0.899 1.55 0.91 7.57 ± 0.25 3.951 2.366 0.898 1.53 0.87 9.30 ± 0.27 3.938 2.359 0.898 1.50 0.8 10.8 ± 0.3 3.927 2.351 0.897 1.45 0.8 11.4 ± 0.3 3.914 2.344 0.896 1.40 0.8 11.3 ± 0.3 3.902 2.337 0.895 1.35 0.8 10.7 ± 0.3 3.890 2.330 0.894 1.31 0.75 9.99 ± 0.30 3.878 2.322 0.893 1.28 0.73 9.38 ± 0.32 3.866 2.315 0.892 1.26 0.71 9.53 ± 0.37 3.854 2.308 0.891 1.24 0.70 9.08 ± 0.47 3.842 2.300 0.890 1.23 0.68 8.84 ± 0.64 3.830 2.293 0.889 1.22 0.67 7.57 ± 1.26

E = 5.507 GeV θ = 22.805^∘

3.659 3.149 0.855 1.78 0.327 0.187 ± 0.026 3.644 3.137 0.854 1.66 0.299 0.334 ± 0.027 3.629 3.124 0.852 1.61 0.276 0.490 ± 0.033 3.614 3.112 0.851 1.58 0.258 0.714 ± 0.038 3.600 3.099 0.850 1.56 0.24 1.19 ± 0.05 3.585 3.087 0.848 1.55 0.23 1.70 ± 0.06 3.571 3.074 0.847 1.52 0.22 2.28 ± 0.07 3.556 3.061 0.846 1.47 0.21 2.64 ± 0.07 3.541 3.049 0.844 1.41 0.20 2.68 ± 0.07 3.527 3.036 0.843 1.35 0.19 2.69 ± 0.07 3.512 3.024 0.841 1.30 0.19 2.54 ± 0.08 3.498 3.011 0.840 1.27 0.18 2.51 ± 0.09

3

Table I. Continued.

E^′ Q^2 ϵ RC RT dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV) (nb/sr-GeV)

3.483 2.999 0.839 1.26 0.18 2.66 ± 0.12 3.468 2.986 0.837 1.25 0.18 2.26 ± 0.18 3.454 2.973 0.836 1.24 0.17 2.08 ± 0.57

E = 5.507 GeV θ = 26.823^∘

3.279 3.886 0.794 1.97 0.1056 0.0376 ± 0.0086 3.263 3.867 0.793 1.69 0.0938 0.0820 ± 0.0080 3.247 3.847 0.791 1.61 0.085 0.130 ± 0.009 3.230 3.828 0.789 1.57 0.078 0.231 ± 0.011 3.214 3.809 0.787 1.55 0.073 0.382 ± 0.013 3.198 3.789 0.785 1.52 0.069 0.557 ± 0.015 3.181 3.770 0.783 1.48 0.065 0.744 ± 0.017 3.165 3.750 0.781 1.40 0.063 0.790 ± 0.018 3.149 3.731 0.779 1.33 0.060 0.808 ± 0.019 3.132 3.712 0.777 1.29 0.058 0.802 ± 0.021 3.116 3.692 0.775 1.27 0.057 0.818 ± 0.028 3.100 3.673 0.773 1.26 0.055 0.851 ± 0.046 3.083 3.654 0.771 1.26 0.054 0.575 ± 0.171

E = 9.800 GeV θ = 13.248^∘

7.545 3.936 0.942 2.11 0.427 0.234 ± 0.062 7.525 3.925 0.941 1.80 0.374 0.391 ± 0.055 7.504 3.914 0.940 1.72 0.335 0.672 ± 0.060 7.483 3.903 0.940 1.67 0.30 1.07 ± 0.07 7.462 3.892 0.939 1.65 0.28 1.76 ± 0.08 7.441 3.882 0.938 1.63 0.26 2.64 ± 0.10 7.420 3.871 0.938 1.58 0.24 3.43 ± 0.12 7.399 3.860 0.937 1.50 0.23 3.53 ± 0.13 7.379 3.849 0.936 1.43 0.22 3.53 ± 0.15 7.358 3.838 0.936 1.39 0.20 3.29 ± 0.18 7.337 3.827 0.935 1.36 0.20 3.57 ± 0.24 7.316 3.816 0.934 1.35 0.19 3.34 ± 0.36

4

Table I. Continued.

E^′ Q^2 ϵ RC RT dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV) (nb/sr-GeV)

E = 9.800 GeV θ = 15.367^∘

7.016 4.916 0.914 1.99 0.1150 0.0844 ± 0.0190 6.988 4.896 0.913 1.74 0.096 0.183 ± 0.019 6.958 4.876 0.912 1.67 0.083 0.360 ± 0.023 6.929 4.855 0.911 1.63 0.074 0.595 ± 0.028 6.900 4.835 0.909 1.56 0.067 0.880 ± 0.039 6.870 4.815 0.908 1.46 0.06 1.04 ± 0.05 6.842 4.794 0.907 1.40 0.057 0.994 ± 0.062 6.812 4.774 0.905 1.38 0.054 0.908 ± 0.100

E = 9.800 GeV θ = 17.516^∘

6.492 5.900 0.881 2.00 0.0381 0.0195 ± 0.0070 6.466 5.875 0.879 1.73 0.0319 0.0755 ± 0.0078 6.438 5.851 0.878 1.66 0.028 0.115 ± 0.009 6.412 5.826 0.876 1.62 0.025 0.203 ± 0.011 6.384 5.802 0.875 1.56 0.022 0.284 ± 0.014 6.358 5.777 0.873 1.47 0.021 0.317 ± 0.018 6.330 5.753 0.872 1.42 0.019 0.342 ± 0.023 6.304 5.728 0.871 1.40 0.018 0.315 ± 0.033 6.277 5.704 0.869 1.39 0.017 0.370 ± 0.114

E = 9.800 GeV θ = 19.753^∘

5.944 6.855 0.839 1.73 0.0120 0.0330 ± 0.0055 5.919 6.826 0.837 1.65 0.0105 0.0382 ± 0.0058 5.895 6.797 0.836 1.60 0.0093 0.0582 ± 0.0073 5.869 6.769 0.834 1.55 0.009 0.102 ± 0.010 5.845 6.740 0.832 1.47 0.008 0.110 ± 0.011 5.820 6.712 0.831 1.43 0.007 0.125 ± 0.015 5.795 6.683 0.829 1.41 0.007 0.154 ± 0.025 5.770 6.655 0.827 1.40 0.007 0.168 ± 0.052

5

Table II. Per nucleon deuteron cross sections in the quasielastic and inelastic resonance regions from SLAC experiment NE11. The errors shown include statistical and point-to-point systematic uncertainties added in quadrature, but do not include an overall normalization error of about 2%. Also shown are RC, the applied multiplicative radiative corrections to the raw cross sections.

E^′ Q^2 ϵ RC dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV)

E = 5.507 GeV θ = 15.146^∘

4.809 1.840 .957 1.50 1.02 ± 0.23 4.800 1.836 .957 1.50 0.87 ± 0.20 4.791 1.833 .957 1.51 1.13 ± 0.17 4.783 1.830 .956 1.51 1.31 ± 0.17 4.774 1.826 .956 1.52 1.71 ± 0.17 4.765 1.823 .956 1.52 2.12 ± 0.19 4.756 1.819 .956 1.53 2.14 ± 0.18 4.747 1.816 .955 1.53 2.37 ± 0.17 4.738 1.813 .955 1.53 3.10 ± 0.18 4.729 1.809 .955 1.54 3.55 ± 0.19 4.721 1.806 .955 1.54 4.56 ± 0.21 4.712 1.803 .954 1.54 5.11 ± 0.22 4.703 1.799 .954 1.55 5.90 ± 0.25 4.694 1.796 .954 1.55 6.94 ± 0.27 4.685 1.792 .954 1.55 8.36 ± 0.29 4.676 1.789 .953 1.56 10.2 ± 0.3 4.667 1.786 .953 1.56 11.7 ± 0.3 4.659 1.782 .953 1.56 14.5 ± 0.4 4.650 1.779 .952 1.56 17.5 ± 0.4 4.641 1.775 .952 1.56 21.2 ± 0.5 4.632 1.772 .952 1.56 25.3 ± 0.6 4.623 1.769 .952 1.56 29.1 ± 0.6 4.614 1.765 .951 1.55 35.7 ± 0.7 4.606 1.762 .951 1.54 41.3 ± 0.8 4.597 1.759 .951 1.53 47.0 ± 0.9 4.588 1.755 .950 1.51 51.7 ± 1.1 4.579 1.752 .950 1.48 53.1 ± 1.4

6

Table II. Continued.

E^′ Q^2 ϵ RC dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV)

4.570 1.748 .950 1.44 54.0 ± 1.2 4.561 1.745 .949 1.40 53.1 ± 1.1 4.552 1.742 .949 1.36 49.9 ± 1.0 4.544 1.738 .949 1.31 45.6 ± 1.0 4.535 1.735 .948 1.27 40.2 ± 0.9 4.526 1.731 .948 1.22 35.5 ± 0.9 4.517 1.728 .948 1.17 31.4 ± 0.9 4.508 1.725 .947 1.13 27.8 ± 0.8 4.499 1.721 .947 1.10 24.9 ± 0.8 4.490 1.718 .946 1.07 22.8 ± 0.9 4.482 1.714 .946 1.04 20.9 ± 0.8 4.473 1.711 .946 1.03 19.2 ± 0.8 4.464 1.708 .945 1.02 18.0 ± 0.9 4.455 1.704 .945 1.01 17.8 ± 0.9 4.446 1.701 .945 1.02 17.7 ± 1.0 4.437 1.698 .944 1.03 17.3 ± 0.9 4.429 1.694 .944 1.05 17.2 ± 1.0 4.420 1.691 .943 1.07 18.1 ± 1.0 4.411 1.687 .943 1.10 19.8 ± 1.1 4.402 1.684 .943 1.13 20.9 ± 1.0 4.393 1.681 .942 1.15 22.5 ± 1.0 4.384 1.677 .942 1.18 24.2 ± 1.0 4.375 1.674 .941 1.20 25.5 ± 0.9 4.367 1.670 .941 1.22 27.3 ± 0.9 4.358 1.667 .940 1.24 28.5 ± 0.8 4.349 1.664 .940 1.25 31.6 ± 0.9 4.340 1.660 .940 1.26 33.9 ± 1.0 4.331 1.657 .939 1.27 34.8 ± 1.3 4.322 1.654 .939 1.27 38.0 ± 1.6 4.313 1.650 .938 1.27 39.1 ± 1.9 4.304 1.647 .938 1.26 40.2 ± 2.3 4.296 1.643 .937 1.26 40.7 ± 2.5 4.287 1.640 .937 1.25 40.0 ± 2.7 4.278 1.637 .936 1.24 41.3 ± 3.2 4.269 1.633 .936 1.23 42.7 ± 3.4 4.260 1.630 .935 1.22 42.5 ± 3.6 4.252 1.626 .935 1.20 40.7 ± 3.6

7

Table II. Continued.

E^′ Q^2 ϵ RC dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV)

4.243 1.623 .934 1.19 41.3 ± 3.8 4.234 1.620 .934 1.18 43.6 ± 4.1 4.225 1.616 .933 1.17 40.9 ± 4.1 4.216 1.613 .933 1.16 38.9 ± 4.3 4.207 1.610 .932 1.15 39.1 ± 4.5 4.198 1.606 .932 1.14 35.9 ± 5.9

E = 5.507 GeV θ = 18.981^∘

4.496 2.692 .928 1.41 .048 ± 0.017 4.484 2.685 .928 1.42 .055 ± 0.016 4.472 2.678 .927 1.42 .128 ± 0.021 4.460 2.671 .927 1.43 .156 ± 0.022 4.448 2.663 .926 1.43 .141 ± 0.019 4.435 2.656 .926 1.44 .133 ± 0.019 4.423 2.649 .925 1.44 .174 ± 0.022 4.411 2.642 .925 1.45 .228 ± 0.024 4.399 2.634 .924 1.46 .282 ± 0.025 4.387 2.627 .924 1.46 .314 ± 0.027 4.375 2.620 .923 1.47 .361 ± 0.030 4.363 2.613 .923 1.47 .428 ± 0.032 4.351 2.605 .922 1.48 .510 ± 0.032 4.338 2.598 .921 1.48 .624 ± 0.032 4.326 2.591 .921 1.49 .787 ± 0.035 4.314 2.584 .920 1.49 .985 ± 0.037 4.302 2.576 .920 1.50 1.18 ± 0.04 4.290 2.569 .919 1.50 1.44 ± 0.04 4.278 2.562 .918 1.50 1.84 ± 0.05 4.266 2.555 .918 1.51 2.26 ± 0.06 4.254 2.547 .917 1.51 2.72 ± 0.07 4.242 2.540 .916 1.51 3.37 ± 0.08 4.229 2.533 .916 1.51 4.16 ± 0.10 4.217 2.525 .915 1.50 5.10 ± 0.11 4.205 2.518 .914 1.49 5.87 ± 0.13 4.193 2.511 .914 1.46 6.68 ± 0.15 4.181 2.504 .913 1.43 7.20 ± 0.20 4.169 2.496 .912 1.40 7.23 ± 0.19

8

Table II. Continued.

E^′ Q^2 ϵ RC dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV)

4.157 2.489 .912 1.36 7.08 ± 0.18 4.145 2.482 .911 1.31 6.61 ± 0.18 4.132 2.475 .910 1.26 6.04 ± 0.17 4.120 2.467 .910 1.21 5.32 ± 0.17 4.108 2.460 .909 1.17 4.75 ± 0.17 4.096 2.453 .908 1.14 4.31 ± 0.17 4.084 2.446 .907 1.11 3.94 ± 0.16 4.072 2.438 .907 1.10 3.71 ± 0.18 4.060 2.431 .906 1.10 3.51 ± 0.19 4.048 2.424 .905 1.11 3.64 ± 0.18 4.035 2.417 .904 1.12 3.71 ± 0.16 4.024 2.409 .903 1.14 4.01 ± 0.17 4.011 2.402 .903 1.17 4.18 ± 0.17 3.999 2.395 .902 1.19 4.53 ± 0.14 3.987 2.388 .901 1.21 5.00 ± 0.13 3.975 2.380 .900 1.23 5.40 ± 0.11 3.963 2.373 .899 1.24 5.67 ± 0.13 3.951 2.366 .898 1.24 5.99 ± 0.19 3.938 2.359 .898 1.25 6.44 ± 0.30 3.927 2.351 .897 1.24 6.88 ± 0.35 3.914 2.344 .896 1.24 7.23 ± 0.40 3.902 2.337 .895 1.23 7.45 ± 0.45 3.890 2.330 .894 1.22 7.62 ± 0.52 3.878 2.322 .893 1.21 7.85 ± 0.57 3.866 2.315 .892 1.20 7.92 ± 0.62 3.854 2.308 .891 1.19 8.09 ± 0.64 3.842 2.300 .890 1.18 7.95 ± 0.72 3.830 2.293 .889 1.17 8.14 ± 0.99

E = 5.507 GeV θ = 22.805^∘

3.936 3.388 .877 1.43 0.172 ± 0.021 3.921 3.376 .876 1.44 0.205 ± 0.017 3.907 3.363 .875 1.44 0.256 ± 0.017 3.892 3.351 .874 1.45 0.331 ± 0.018 3.877 3.338 .873 1.45 0.424 ± 0.020 3.863 3.326 .871 1.46 0.542 ± 0.022

9

Table II. Continued.

E^′ Q^2 ϵ RC dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV)

3.848 3.313 .870 1.46 0.676 ± 0.025 3.834 3.300 .869 1.46 0.865 ± 0.030 3.819 3.288 .868 1.45 1.03 ± 0.04 3.804 3.275 .867 1.44 1.24 ± 0.04 3.790 3.263 .866 1.41 1.40 ± 0.04 3.775 3.250 .865 1.38 1.54 ± 0.05 3.761 3.238 .864 1.34 1.52 ± 0.05 3.746 3.225 .862 1.30 1.43 ± 0.05 3.731 3.212 .861 1.25 1.33 ± 0.05 3.717 3.200 .860 1.21 1.23 ± 0.05 3.702 3.187 .859 1.17 1.10 ± 0.04 3.687 3.175 .858 1.15 1.05 ± 0.05 3.673 3.162 .856 1.14 1.01 ± 0.05 3.659 3.149 .855 1.15 1.01 ± 0.05 3.644 3.137 .854 1.16 1.02 ± 0.05 3.629 3.124 .852 1.17 1.09 ± 0.05 3.614 3.112 .851 1.19 1.16 ± 0.04 3.600 3.099 .850 1.21 1.31 ± 0.03 3.585 3.087 .848 1.22 1.39 ± 0.04 3.571 3.074 .847 1.23 1.51 ± 0.04 3.556 3.061 .846 1.23 1.67 ± 0.07 3.541 3.049 .844 1.22 1.79 ± 0.08 3.527 3.036 .843 1.22 1.83 ± 0.09 3.512 3.024 .841 1.21 1.95 ± 0.11 3.498 3.011 .840 1.20 2.01 ± 0.14 3.483 2.999 .839 1.19 2.00 ± 0.15 3.468 2.986 .837 1.19 2.18 ± 0.18 3.454 2.973 .836 1.18 1.98 ± 0.38

E = 5.507 GeV θ = 26.823^∘

3.524 4.176 .819 1.39 0.060 ± 0.009 3.508 4.157 .818 1.40 0.062 ± 0.007 3.491 4.138 .816 1.40 0.091 ± 0.007 3.475 4.118 .815 1.41 0.119 ± 0.008 3.459 4.099 .813 1.41 0.153 ± 0.008 3.442 4.079 .811 1.42 0.200 ± 0.010

10

Table II. Continued.

E^′ Q^2 ϵ RC dσ/dΩdE^′ (GeV) (GeV/c)^2 (nb/sr-GeV)

3.426 4.060 .810 1.41 0.256 ± 0.011 3.410 4.041 .808 1.41 0.306 ± 0.013 3.393 4.021 .806 1.37 0.352 ± 0.015 3.377 4.002 .805 1.34 0.389 ± 0.017 3.361 3.983 .803 1.31 0.407 ± 0.016 3.344 3.963 .801 1.28 0.395 ± 0.018 3.328 3.944 .800 1.24 0.370 ± 0.018 3.312 3.925 .798 1.20 0.346 ± 0.015 3.295 3.905 .796 1.18 0.331 ± 0.019 3.279 3.886 .794 1.17 0.324 ± 0.018 3.263 3.867 .793 1.17 0.321 ± 0.016 3.247 3.847 .791 1.18 0.349 ± 0.016 3.230 3.828 .789 1.19 0.367 ± 0.013 3.214 3.809 .787 1.20 0.404 ± 0.014 3.198 3.789 .785 1.21 0.450 ± 0.011 3.181 3.770 .783 1.21 0.499 ± 0.018 3.165 3.750 .781 1.21 0.527 ± 0.021 3.149 3.731 .779 1.21 0.585 ± 0.022 3.132 3.712 .777 1.20 0.594 ± 0.034 3.116 3.692 .775 1.20 0.670 ± 0.043 3.100 3.673 .773 1.19 0.673 ± 0.052 3.083 3.654 .771 1.19 0.707 ± 0.174

Table III. Resonance widths and masses used in fits. The index i = Δ, 2, or 3 denotes the Δ(1232) resonance and resonances 2 and 3, respectively. Q^2 is in units of (GeV/c)^2

i Γ_i (GeV) M_i (GeV)

Δ 0.120 1.232 2 0.074 1.503 3 0.094 1.677(1 + 0.0102Q^2 − 0.00084Q^4)

Table IV. Results [?] of a global fit to the proton inelastic cross sections in units of μb and normalized to [G_D(Q^2)]^2. These coefficients are defined in Eqs. 3, 5, and 8. As described in the text, each coefficient has a polynomial dependence on Q^2 which is in (GeV/c)^2. The global fit gives a χ^2 per 523 degrees of freedom of 1.56.

Q^{(2∗n)} |F_Δ|^2_n A_{2n} A_{3n} C_{1n} C_{2n} C_{3n}

Q^0 1.396E+01 −3.153E+00 −4.540E−01 3.167E+02 −1.711E+01 −1.836E+02 Q^2 −2.879E+00 2.933E+01 1.935E+01 1.490E+03 −5.320E+03 4.144E+03 Q^4 1.587E−01 6.120E+02 5.364E+03 −4.890E+03 Q^6 1.823E+01 −1.224E+03 1.229E+03 Q^8 −6.437E+00 7.816E+01 −7.934E+01

Table V. NE11 and E133 Δ(1232) transition form factor results determined from cross section data and normalized to μ_pG_D(Q^2). The first uncertainty is statistical, and the second is systematic including modeling and normalization uncertainties. Also shown are the χ^2/dof values.

Q^2 (GeV/c)^2 F_Δ(Q^2)/μ_pG_D(Q^2) χ^2/dof Experiment

1.64 1.139± 0.007 ± 0.023 0.82 NE11 2.34 1.014± 0.007 ± 0.021 1.01 NE11 3.05 0.911± 0.008 ± 0.022 1.87 NE11 3.75 0.804± 0.008 ± 0.024 5.30 NE11 3.86 0.856± 0.014 ± 0.038 1.17 NE11 4.82 0.732± 0.020 ± 0.040 1.92 NE11 5.79 0.656± 0.024 ± 0.047 0.73 NE11 6.75 0.513± 0.052 ± 0.070 1.27 NE11 2.41 1.017± 0.009 ± 0.068 1.48 E133 3.90 0.773± 0.017 ± 0.069 0.91 E133 5.87 0.557± 0.017 ± 0.131 2.22 E133 7.86 0.431± 0.034 ± 0.174 1.50 E133 9.83 0.317± 0.046 ± 0.245 1.60 E133

Table VI. Ratios σ_n/σ_p extracted from inelastic e-d cross sections in the region of the Δ(1232) resonance for both resonant and non-resonant cross section components. The first uncertainty is statistical and the second is the quadratically combined systematic and modeling (dominant) uncertainties. The last line gives the combined χ^2/dof for each fit.

Q^2 (σ_n/σ_p)_Δ (σ_n/σ_p)_{nres} (σ_n/σ_p)_{nres} (σ_n/σ_p)_{total} Exp. (^{GeV}_c )^2 Fit I Fit I Fit II Fit III

1.64 0.81±0.10±0.05 0.69±0.15±0.12 0.41±0.04±0.15 0.76±0.02±0.07 NE11 2.34 0.73±0.13±0.09 0.77±0.12±0.11 0.53±0.04±0.14 0.75±0.02±0.08 NE11 3.05 0.63±0.22±0.10 0.63±0.13±0.11 0.43±0.04±0.13 0.63±0.03±0.09 NE11 3.75 0.14±0.35±0.21 0.69±0.14±0.10 0.37±0.04±0.12 0.54±0.03±0.10 NE11 2.41 0.71±0.05±0.16 0.53±0.02±0.17 0.45±0.02±0.15 0.57±0.01±0.11 E133 3.90 0.61±0.10±0.21 0.45±0.03±0.13 0.36±0.02±0.12 0.48±0.01±0.10 E133 5.87 0.83±0.24±0.43 0.43±0.02±0.13 0.42±0.02±0.11 0.46±0.01±0.11 E133 7.86 1.03±1.02±0.92 0.46±0.04±0.13 0.47±0.02±0.11 0.48±0.02±0.11 E133 χ^2/dof 1.41 1.52 1.40