Quasi Elastic Electon-Deuteron Scattering Cross Sections. From Table 21 of Allison Lung’s thesis

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

Q^2 = 1.75 E0 = 1.511 θ=89.97 1.6 GeV data 0.612 0.49E+00 0.20E-01 0.20E-01 0.48E-02 0.606 0.63E+00 0.13E-01 0.11E-01 0.61E-02 0.600 0.81E+00 0.12E-01 0.91E-02 0.79E-02 0.594 0.10E+01 0.13E-01 0.82E-02 0.10E-01 0.588 0.13E+01 0.15E-01 0.78E-02 0.13E-01 0.582 0.15E+01 0.20E-01 0.14E-01 0.14E-01 0.575 0.15E+01 0.26E-01 0.21E-01 0.15E-01 0.569 0.15E+01 0.17E-01 0.83E-02 0.15E-01 0.563 0.13E+01 0.15E-01 0.77E-02 0.13E-01 0.557 0.11E+01 0.13E-01 0.75E-02 0.11E-01 0.551 0.96E+00 0.12E-01 0.78E-02 0.93E-02 0.545 0.82E+00 0.12E-01 0.86E-02 0.79E-02 0.539 0.72E+00 0.12E-01 0.99E-02 0.70E-02 0.533 0.64E+00 0.11E-01 0.89E-02 0.61E-02 0.526 0.60E+00 0.10E-01 0.86E-02 0.58E-02 0.520 0.58E+00 0.11E-01 0.91E-02 0.56E-02 0.514 0.62E+00 0.13E-01 0.11E-01 0.60E-02

Q^2 = 1.75 E0 = 1.511 θ=90.07 8 GeV data 0.600 0.81E+00 0.40E-01 0.39E-01 0.57E-02 0.594 0.10E+01 0.27E-01 0.26E-01 0.72E-02 0.588 0.13E+01 0.29E-01 0.27E-01 0.91E-02 0.582 0.15E+01 0.33E-01 0.32E-01 0.11E-01 0.575 0.15E+01 0.35E-01 0.33E-01 0.11E-01

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

0.569 0.14E+01 0.30E-01 0.28E-01 0.10E-01 0.563 0.14E+01 0.31E-01 0.29E-01 0.99E-02 0.557 0.99E+00 0.50E-01 0.50E-01 0.70E-02 0.551 0.96E+00 0.57E-01 0.57E-01 0.68E-02 0.545 0.78E+00 0.38E-01 0.38E-01 0.55E-02 0.539 0.76E+00 0.35E-01 0.34E-01 0.53E-02 0.533 0.65E+00 0.31E-01 0.31E-01 0.46E-02 0.526 0.61E+00 0.31E-01 0.30E-01 0.43E-02 0.520 0.63E+00 0.34E-01 0.34E-01 0.44E-02 0.514 0.58E+00 0.58E-01 0.58E-01 0.40E-02

Q^2 = 1.75 E0 = 1.968 θ=55.21 8 GeV data 1.124 0.38E+00 0.81E-01 0.81E-01 0.26E-02 1.115 0.37E+00 0.19E-01 0.19E-01 0.25E-02 1.107 0.49E+00 0.15E-01 0.15E-01 0.34E-02 1.099 0.64E+00 0.16E-01 0.16E-01 0.45E-02 1.090 0.86E+00 0.19E-01 0.18E-01 0.60E-02 1.082 0.11E+01 0.20E-01 0.18E-01 0.78E-02 1.073 0.15E+01 0.23E-01 0.21E-01 0.11E-01 1.065 0.20E+01 0.28E-01 0.24E-01 0.14E-01 1.057 0.26E+01 0.33E-01 0.27E-01 0.19E-01 1.048 0.31E+01 0.39E-01 0.32E-01 0.23E-01 1.040 0.35E+01 0.60E-01 0.54E-01 0.26E-01 1.031 0.36E+01 0.83E-01 0.78E-01 0.27E-01 1.023 0.35E+01 0.70E-01 0.66E-01 0.26E-01 1.014 0.31E+01 0.80E-01 0.76E-01 0.23E-01 1.006 0.23E+01 0.15E+00 0.15E+00 0.17E-01

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

0.998 0.23E+01 0.63E-01 0.60E-01 0.16E-01 0.989 0.19E+01 0.43E-01 0.41E-01 0.14E-01 0.981 0.16E+01 0.36E-01 0.34E-01 0.11E-01 0.972 0.14E+01 0.32E-01 0.31E-01 0.98E-02 0.964 0.13E+01 0.31E-01 0.30E-01 0.92E-02 0.956 0.13E+01 0.32E-01 0.30E-01 0.91E-02 0.947 0.14E+01 0.34E-01 0.33E-01 0.95E-02 0.939 0.14E+01 0.41E-01 0.39E-01 0.10E-01 0.930 0.16E+01 0.96E-01 0.95E-01 0.12E-01

Q^2 = 1.75 E0 = 2.407 θ=41.11 8 GeV data 1.607 0.28E+00 0.40E-01 0.40E-01 0.19E-02 1.597 0.36E+00 0.31E-01 0.31E-01 0.25E-02 1.587 0.40E+00 0.29E-01 0.28E-01 0.27E-02 1.577 0.55E+00 0.32E-01 0.32E-01 0.38E-02 1.568 0.68E+00 0.35E-01 0.34E-01 0.47E-02 1.558 0.95E+00 0.41E-01 0.40E-01 0.66E-02 1.548 0.12E+01 0.45E-01 0.44E-01 0.82E-02 1.538 0.16E+01 0.50E-01 0.48E-01 0.11E-01 1.528 0.21E+01 0.42E-01 0.39E-01 0.15E-01 1.519 0.28E+01 0.41E-01 0.36E-01 0.20E-01 1.509 0.36E+01 0.47E-01 0.39E-01 0.26E-01 1.499 0.46E+01 0.55E-01 0.44E-01 0.34E-01 1.489 0.55E+01 0.64E-01 0.50E-01 0.41E-01 1.479 0.63E+01 0.89E-01 0.76E-01 0.47E-01 1.470 0.64E+01 0.11E+00 0.96E-01 0.48E-01 1.460 0.61E+01 0.69E-01 0.53E-01 0.45E-01

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

1.450 0.55E+01 0.63E-01 0.49E-01 0.40E-01 1.440 0.46E+01 0.57E-01 0.45E-01 0.34E-01 1.430 0.39E+01 0.55E-01 0.47E-01 0.28E-01 1.421 0.32E+01 0.78E-01 0.74E-01 0.23E-01 1.411 0.29E+01 0.13E+00 0.13E+00 0.21E-01 1.401 0.26E+01 0.70E-01 0.67E-01 0.19E-01 1.391 0.24E+01 0.56E-01 0.53E-01 0.17E-01 1.381 0.22E+01 0.52E-01 0.49E-01 0.16E-01 1.372 0.22E+01 0.51E-01 0.48E-01 0.16E-01 1.362 0.24E+01 0.53E-01 0.50E-01 0.17E-01 1.352 0.27E+01 0.59E-01 0.56E-01 0.19E-01 1.342 0.30E+01 0.65E-01 0.61E-01 0.22E-01 1.333 0.34E+01 0.73E-01 0.68E-01 0.25E-01 1.323 0.40E+01 0.86E-01 0.81E-01 0.29E-01 1.313 0.47E+01 0.13E+00 0.12E+00 0.35E-01 1.303 0.51E+01 0.38E+00 0.37E+00 0.37E-01

Q^2 = 1.75 E0 = 5.507 θ=15.15 8 GeV data 4.807 0.10E+01 0.24E+00 0.24E+00 0.72E-02 4.794 0.11E+01 0.18E+00 0.18E+00 0.73E-02 4.780 0.13E+01 0.14E+00 0.14E+00 0.88E-02 4.767 0.20E+01 0.15E+00 0.15E+00 0.14E-01 4.754 0.21E+01 0.15E+00 0.15E+00 0.15E-01 4.741 0.27E+01 0.15E+00 0.14E+00 0.19E-01 4.727 0.36E+01 0.16E+00 0.16E+00 0.25E-01 4.714 0.48E+01 0.18E+00 0.18E+00 0.34E-01 4.701 0.59E+01 0.20E+00 0.20E+00 0.43E-01

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

4.687 0.75E+01 0.23E+00 0.22E+00 0.54E-01 4.674 0.10E+02 0.26E+00 0.25E+00 0.73E-01 4.661 0.13E+02 0.29E+00 0.28E+00 0.94E-01 4.648 0.17E+02 0.34E+00 0.32E+00 0.13E+00 4.634 0.23E+02 0.41E+00 0.37E+00 0.18E+00 4.621 0.29E+02 0.47E+00 0.41E+00 0.22E+00 4.608 0.38E+02 0.56E+00 0.47E+00 0.30E+00 4.594 0.46E+02 0.65E+00 0.53E+00 0.37E+00 4.581 0.52E+02 0.89E+00 0.79E+00 0.43E+00 4.568 0.53E+02 0.93E+00 0.82E+00 0.43E+00 4.555 0.51E+02 0.69E+00 0.56E+00 0.41E+00 4.541 0.45E+02 0.59E+00 0.47E+00 0.36E+00 4.528 0.37E+02 0.50E+00 0.41E+00 0.29E+00 4.515 0.31E+02 0.43E+00 0.35E+00 0.24E+00 4.502 0.26E+02 0.37E+00 0.32E+00 0.20E+00 4.488 0.22E+02 0.34E+00 0.29E+00 0.17E+00 4.475 0.19E+02 0.32E+00 0.29E+00 0.15E+00 4.462 0.17E+02 0.32E+00 0.29E+00 0.13E+00 4.448 0.17E+02 0.35E+00 0.32E+00 0.13E+00 4.435 0.17E+02 0.39E+00 0.36E+00 0.13E+00 4.422 0.17E+02 0.44E+00 0.42E+00 0.13E+00 4.409 0.19E+02 0.47E+00 0.45E+00 0.15E+00 4.395 0.21E+02 0.51E+00 0.48E+00 0.16E+00 4.382 0.24E+02 0.55E+00 0.52E+00 0.18E+00 4.369 0.26E+02 0.60E+00 0.56E+00 0.20E+00 4.355 0.28E+02 0.64E+00 0.60E+00 0.22E+00

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

4.342 0.33E+02 0.70E+00 0.65E+00 0.26E+00 4.329 0.35E+02 0.73E+00 0.68E+00 0.27E+00 4.316 0.38E+02 0.78E+00 0.72E+00 0.30E+00 4.302 0.40E+02 0.81E+00 0.75E+00 0.31E+00 4.289 0.41E+02 0.83E+00 0.77E+00 0.32E+00 4.276 0.41E+02 0.87E+00 0.80E+00 0.32E+00 4.262 0.43E+02 0.93E+00 0.87E+00 0.33E+00 4.249 0.41E+02 0.10E+01 0.96E+00 0.32E+00 4.236 0.42E+02 0.12E+01 0.12E+01 0.33E+00 4.223 0.42E+02 0.16E+01 0.15E+01 0.32E+00 4.209 0.37E+02 0.25E+01 0.24E+01 0.29E+00 4.196 0.34E+02 0.11E+02 0.11E+02 0.26E+00

Q^2 = 2.50 E0 = 1.968 θ=89.97 1.6 GeV data 0.698 0.35E-01 0.32E-02 0.32E-02 0.34E-03 0.691 0.44E-01 0.24E-02 0.23E-02 0.42E-03 0.684 0.57E-01 0.21E-02 0.21E-02 0.55E-03 0.677 0.78E-01 0.21E-02 0.20E-02 0.75E-03 0.670 0.11E+00 0.22E-02 0.20E-02 0.11E-02 0.663 0.15E+00 0.25E-02 0.20E-02 0.14E-02 0.656 0.20E+00 0.29E-02 0.22E-02 0.19E-02 0.650 0.25E+00 0.34E-02 0.23E-02 0.25E-02 0.643 0.30E+00 0.39E-02 0.26E-02 0.29E-02 0.636 0.33E+00 0.65E-02 0.56E-02 0.33E-02 0.629 0.34E+00 0.48E-02 0.34E-02 0.34E-02 0.622 0.31E+00 0.45E-02 0.33E-02 0.31E-02 0.615 0.27E+00 0.44E-02 0.35E-02 0.26E-02

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

0.608 0.24E+00 0.42E-02 0.35E-02 0.23E-02 0.601 0.21E+00 0.41E-02 0.36E-02 0.20E-02 0.594 0.20E+00 0.42E-02 0.38E-02 0.19E-02 0.588 0.18E+00 0.40E-02 0.36E-02 0.18E-02 0.581 0.19E+00 0.41E-02 0.37E-02 0.18E-02 0.574 0.21E+00 0.49E-02 0.44E-02 0.21E-02

Q^2 = 2.50 E0 = 1.968 θ=89.95 8 GeV data 0.663 0.17E+00 0.30E-01 0.30E-01 0.12E-02 0.656 0.22E+00 0.15E-01 0.15E-01 0.15E-02 0.650 0.25E+00 0.15E-01 0.15E-01 0.18E-02 0.643 0.27E+00 0.15E-01 0.15E-01 0.20E-02 0.636 0.33E+00 0.18E-01 0.17E-01 0.24E-02 0.629 0.33E+00 0.16E-01 0.16E-01 0.24E-02 0.622 0.34E+00 0.18E-01 0.18E-01 0.25E-02 0.615 0.20E+00 0.25E-01 0.25E-01 0.14E-02

Q^2 = 2.50 E0 = 2.407 θ=58.88 8 GeV data 1.122 0.18E+00 0.25E-01 0.25E-01 0.13E-02 1.113 0.30E+00 0.95E-02 0.92E-02 0.22E-02 1.103 0.42E+00 0.86E-02 0.80E-02 0.31E-02 1.094 0.52E+00 0.92E-02 0.84E-02 0.38E-02 1.084 0.62E+00 0.10E-01 0.89E-02 0.46E-02 1.075 0.67E+00 0.17E-01 0.16E-01 0.50E-02 1.065 0.69E+00 0.11E-01 0.94E-02 0.51E-02 1.056 0.63E+00 0.10E-01 0.89E-02 0.46E-02 1.046 0.57E+00 0.10E-01 0.91E-02 0.41E-02 1.037 0.48E+00 0.15E-01 0.14E-01 0.35E-02

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

1.027 0.46E+00 0.28E-01 0.27E-01 0.33E-02 1.018 0.39E+00 0.15E-01 0.14E-01 0.28E-02 1.008 0.36E+00 0.13E-01 0.13E-01 0.26E-02 0.999 0.39E+00 0.13E-01 0.13E-01 0.28E-02 0.989 0.40E+00 0.13E-01 0.13E-01 0.28E-02 0.980 0.44E+00 0.14E-01 0.14E-01 0.32E-02 0.970 0.52E+00 0.17E-01 0.16E-01 0.38E-02 0.961 0.61E+00 0.22E-01 0.22E-01 0.45E-02 0.951 0.78E+00 0.65E-01 0.65E-01 0.57E-02

Q^2 = 2.50 E0 = 2.837 θ=44.99 8 GeV data 1.629 0.77E-01 0.27E-01 0.27E-01 0.53E-03 1.618 0.83E-01 0.11E-01 0.11E-01 0.58E-03 1.607 0.13E+00 0.10E-01 0.10E-01 0.89E-03 1.595 0.17E+00 0.11E-01 0.11E-01 0.12E-02 1.584 0.22E+00 0.13E-01 0.12E-01 0.16E-02 1.573 0.29E+00 0.14E-01 0.14E-01 0.20E-02 1.561 0.41E+00 0.12E-01 0.12E-01 0.29E-02 1.550 0.54E+00 0.11E-01 0.11E-01 0.39E-02 1.539 0.72E+00 0.13E-01 0.12E-01 0.53E-02 1.527 0.90E+00 0.14E-01 0.13E-01 0.67E-02 1.516 0.11E+01 0.16E-01 0.14E-01 0.80E-02 1.505 0.12E+01 0.27E-01 0.25E-01 0.88E-02 1.494 0.12E+01 0.18E-01 0.16E-01 0.88E-02 1.482 0.11E+01 0.17E-01 0.15E-01 0.80E-02 1.471 0.93E+00 0.16E-01 0.15E-01 0.68E-02 1.460 0.82E+00 0.17E-01 0.15E-01 0.60E-02

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

1.448 0.71E+00 0.27E-01 0.27E-01 0.51E-02 1.437 0.70E+00 0.42E-01 0.42E-01 0.50E-02 1.426 0.62E+00 0.25E-01 0.25E-01 0.45E-02 1.414 0.64E+00 0.23E-01 0.23E-01 0.46E-02 1.403 0.67E+00 0.23E-01 0.23E-01 0.48E-02 1.392 0.74E+00 0.24E-01 0.24E-01 0.53E-02 1.380 0.85E+00 0.27E-01 0.26E-01 0.62E-02 1.369 0.94E+00 0.29E-01 0.28E-01 0.69E-02 1.358 0.12E+01 0.34E-01 0.33E-01 0.85E-02 1.347 0.13E+01 0.41E-01 0.40E-01 0.93E-02 1.335 0.14E+01 0.75E-01 0.74E-01 0.11E-01

Q^2 = 2.50 E0 = 5.507 θ=18.98 8 GeV data 4.498 0.41E-01 0.17E-01 0.17E-01 0.28E-03 4.482 0.64E-01 0.15E-01 0.15E-01 0.43E-03 4.466 0.14E+00 0.18E-01 0.18E-01 0.93E-03 4.450 0.17E+00 0.18E-01 0.18E-01 0.11E-02 4.433 0.13E+00 0.17E-01 0.17E-01 0.90E-03 4.417 0.18E+00 0.19E-01 0.19E-01 0.13E-02 4.401 0.28E+00 0.23E-01 0.22E-01 0.19E-02 4.385 0.32E+00 0.24E-01 0.24E-01 0.22E-02 4.369 0.38E+00 0.26E-01 0.26E-01 0.27E-02 4.353 0.48E+00 0.27E-01 0.27E-01 0.34E-02 4.336 0.63E+00 0.26E-01 0.26E-01 0.45E-02 4.320 0.86E+00 0.27E-01 0.26E-01 0.62E-02 4.304 0.11E+01 0.28E-01 0.27E-01 0.81E-02 4.288 0.15E+01 0.30E-01 0.28E-01 0.11E-01

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

4.272 0.20E+01 0.34E-01 0.31E-01 0.15E-01 4.256 0.26E+01 0.40E-01 0.35E-01 0.19E-01 4.240 0.33E+01 0.47E-01 0.39E-01 0.26E-01 4.223 0.45E+01 0.58E-01 0.46E-01 0.35E-01 4.207 0.55E+01 0.68E-01 0.52E-01 0.44E-01 4.191 0.66E+01 0.79E-01 0.59E-01 0.53E-01 4.175 0.72E+01 0.14E+00 0.13E+00 0.58E-01 4.159 0.70E+01 0.87E-01 0.67E-01 0.56E-01 4.143 0.65E+01 0.75E-01 0.54E-01 0.52E-01 4.126 0.57E+01 0.65E-01 0.47E-01 0.44E-01 4.110 0.48E+01 0.56E-01 0.42E-01 0.37E-01 4.094 0.42E+01 0.49E-01 0.38E-01 0.32E-01 4.078 0.37E+01 0.46E-01 0.36E-01 0.28E-01 4.062 0.34E+01 0.44E-01 0.36E-01 0.26E-01 4.046 0.35E+01 0.48E-01 0.39E-01 0.27E-01 4.029 0.37E+01 0.54E-01 0.46E-01 0.28E-01 4.013 0.41E+01 0.64E-01 0.56E-01 0.31E-01 3.997 0.44E+01 0.79E-01 0.71E-01 0.34E-01 3.981 0.51E+01 0.87E-01 0.78E-01 0.39E-01 3.965 0.55E+01 0.93E-01 0.83E-01 0.43E-01 3.949 0.60E+01 0.10E+00 0.89E-01 0.47E-01 3.932 0.66E+01 0.11E+00 0.95E-01 0.51E-01 3.916 0.71E+01 0.12E+00 0.10E+00 0.56E-01 3.900 0.74E+01 0.12E+00 0.11E+00 0.58E-01 3.884 0.77E+01 0.14E+00 0.13E+00 0.59E-01 3.868 0.79E+01 0.17E+00 0.16E+00 0.61E-01

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

3.852 0.79E+01 0.25E+00 0.24E+00 0.61E-01 3.836 0.71E+01 0.54E+00 0.54E+00 0.54E-01

Q^2 = 3.25 E0 = 2.407 θ=89.97 1.6 GeV data 0.736 0.15E-01 0.23E-02 0.23E-02 0.14E-03 0.728 0.17E-01 0.21E-02 0.21E-02 0.17E-03 0.721 0.24E-01 0.19E-02 0.19E-02 0.23E-03 0.713 0.30E-01 0.14E-02 0.14E-02 0.29E-03 0.706 0.40E-01 0.12E-02 0.12E-02 0.39E-03 0.698 0.53E-01 0.12E-02 0.11E-02 0.52E-03 0.691 0.70E-01 0.13E-02 0.11E-02 0.69E-03 0.683 0.87E-01 0.14E-02 0.11E-02 0.86E-03 0.676 0.98E-01 0.20E-02 0.17E-02 0.97E-03 0.668 0.10E+00 0.16E-02 0.12E-02 0.99E-03 0.661 0.96E-01 0.15E-02 0.11E-02 0.94E-03 0.653 0.88E-01 0.14E-02 0.11E-02 0.87E-03 0.646 0.77E-01 0.14E-02 0.11E-02 0.75E-03 0.639 0.72E-01 0.14E-02 0.12E-02 0.70E-03 0.631 0.74E-01 0.17E-02 0.15E-02 0.72E-03 0.624 0.77E-01 0.18E-02 0.16E-02 0.75E-03 0.616 0.85E-01 0.19E-02 0.17E-02 0.83E-03 0.609 0.95E-01 0.21E-02 0.19E-02 0.93E-03 0.601 0.11E+00 0.26E-02 0.23E-02 0.11E-02

Q^2 = 3.25 E0 = 2.837 θ=61.21 8 GeV data 1.189 0.21E-01 0.37E-02 0.37E-02 0.15E-03 1.179 0.32E-01 0.34E-02 0.34E-02 0.22E-03 1.168 0.41E-01 0.35E-02 0.35E-02 0.29E-03

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

1.158 0.56E-01 0.40E-02 0.40E-02 0.40E-03 1.148 0.86E-01 0.38E-02 0.38E-02 0.62E-03 1.137 0.11E+00 0.33E-02 0.32E-02 0.81E-03 1.127 0.14E+00 0.35E-02 0.33E-02 0.11E-02 1.117 0.18E+00 0.39E-02 0.37E-02 0.13E-02 1.106 0.19E+00 0.54E-02 0.52E-02 0.14E-02 1.096 0.19E+00 0.45E-02 0.42E-02 0.14E-02 1.085 0.19E+00 0.44E-02 0.42E-02 0.14E-02 1.075 0.17E+00 0.45E-02 0.43E-02 0.12E-02 1.065 0.16E+00 0.78E-02 0.78E-02 0.11E-02 1.054 0.14E+00 0.10E-01 0.10E-01 0.10E-02 1.044 0.13E+00 0.59E-02 0.58E-02 0.92E-03 1.034 0.15E+00 0.60E-02 0.59E-02 0.10E-02 1.023 0.15E+00 0.62E-02 0.61E-02 0.11E-02 1.013 0.18E+00 0.65E-02 0.63E-02 0.13E-02 1.002 0.21E+00 0.75E-02 0.73E-02 0.15E-02 0.992 0.24E+00 0.88E-02 0.86E-02 0.18E-02 0.982 0.28E+00 0.16E-01 0.16E-01 0.21E-02

Q^2 = 3.25 E0 = 5.507 θ=22.80 8 GeV data 3.941 0.18E+00 0.30E-01 0.30E-01 0.13E-02 3.923 0.20E+00 0.15E-01 0.15E-01 0.15E-02 3.905 0.26E+00 0.12E-01 0.12E-01 0.19E-02 3.887 0.36E+00 0.11E-01 0.11E-01 0.27E-02 3.868 0.49E+00 0.12E-01 0.11E-01 0.36E-02 3.850 0.66E+00 0.14E-01 0.13E-01 0.50E-02 3.832 0.88E+00 0.16E-01 0.14E-01 0.67E-02

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

3.814 0.11E+01 0.18E-01 0.16E-01 0.86E-02 3.795 0.13E+01 0.20E-01 0.17E-01 0.10E-01 3.777 0.15E+01 0.32E-01 0.29E-01 0.12E-01 3.759 0.15E+01 0.21E-01 0.18E-01 0.12E-01 3.740 0.14E+01 0.19E-01 0.15E-01 0.11E-01 3.722 0.13E+01 0.17E-01 0.14E-01 0.97E-02 3.704 0.11E+01 0.15E-01 0.12E-01 0.83E-02 3.686 0.10E+01 0.14E-01 0.12E-01 0.76E-02 3.667 0.98E+00 0.14E-01 0.12E-01 0.73E-02 3.649 0.98E+00 0.16E-01 0.14E-01 0.73E-02 3.631 0.10E+01 0.19E-01 0.17E-01 0.79E-02 3.613 0.11E+01 0.22E-01 0.21E-01 0.86E-02 3.594 0.13E+01 0.26E-01 0.24E-01 0.10E-01 3.576 0.14E+01 0.28E-01 0.26E-01 0.11E-01 3.558 0.16E+01 0.31E-01 0.28E-01 0.13E-01 3.540 0.18E+01 0.34E-01 0.31E-01 0.14E-01 3.521 0.18E+01 0.37E-01 0.35E-01 0.14E-01 3.503 0.20E+01 0.46E-01 0.44E-01 0.15E-01 3.485 0.20E+01 0.65E-01 0.63E-01 0.15E-01 3.467 0.21E+01 0.15E+00 0.15E+00 0.16E-01

Q^2 = 4.00 E0 = 2.837 θ=89.97 1.6 GeV data 0.772 0.37E-02 0.84E-03 0.84E-03 0.36E-04 0.766 0.55E-02 0.81E-03 0.81E-03 0.52E-04 0.759 0.69E-02 0.80E-03 0.80E-03 0.66E-04 0.752 0.88E-02 0.78E-03 0.78E-03 0.85E-04 0.746 0.11E-01 0.76E-03 0.75E-03 0.11E-03

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

0.739 0.14E-01 0.77E-03 0.76E-03 0.14E-03 0.733 0.17E-01 0.78E-03 0.76E-03 0.17E-03 0.726 0.23E-01 0.81E-03 0.78E-03 0.22E-03 0.719 0.28E-01 0.85E-03 0.80E-03 0.28E-03 0.713 0.33E-01 0.87E-03 0.81E-03 0.33E-03 0.706 0.37E-01 0.10E-02 0.94E-03 0.36E-03 0.699 0.38E-01 0.94E-03 0.86E-03 0.38E-03 0.693 0.37E-01 0.91E-03 0.83E-03 0.37E-03 0.686 0.36E-01 0.91E-03 0.84E-03 0.35E-03 0.680 0.33E-01 0.89E-03 0.83E-03 0.32E-03 0.673 0.31E-01 0.90E-03 0.85E-03 0.30E-03 0.666 0.31E-01 0.95E-03 0.90E-03 0.30E-03 0.660 0.34E-01 0.11E-02 0.10E-02 0.33E-03 0.653 0.35E-01 0.11E-02 0.11E-02 0.34E-03 0.646 0.41E-01 0.12E-02 0.12E-02 0.41E-03 0.640 0.47E-01 0.13E-02 0.12E-02 0.46E-03 0.633 0.52E-01 0.15E-02 0.14E-02 0.51E-03 0.627 0.56E-01 0.17E-02 0.16E-02 0.56E-03

Q^2 = 4.00 E0 = 5.507 θ=26.82 8 GeV data 3.524 0.57E-01 0.97E-02 0.96E-02 0.41E-03 3.508 0.60E-01 0.48E-02 0.48E-02 0.44E-03 3.491 0.92E-01 0.40E-02 0.40E-02 0.67E-03 3.475 0.12E+00 0.38E-02 0.37E-02 0.88E-03 3.459 0.15E+00 0.39E-02 0.37E-02 0.12E-02 3.442 0.20E+00 0.42E-02 0.39E-02 0.15E-02 3.426 0.26E+00 0.48E-02 0.43E-02 0.20E-02

E^{0 dσ}_{dΩdE0} �(Total) �(Stat.) �(Syst.) (GeV) [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)] [nb/(sr�GeV)]

3.410 0.31E+00 0.52E-02 0.46E-02 0.24E-02 3.393 0.35E+00 0.56E-02 0.49E-02 0.27E-02 3.377 0.38E+00 0.88E-02 0.82E-02 0.30E-02 3.361 0.40E+00 0.63E-02 0.55E-02 0.32E-02 3.344 0.39E+00 0.55E-02 0.46E-02 0.30E-02 3.328 0.36E+00 0.51E-02 0.43E-02 0.28E-02 3.312 0.34E+00 0.48E-02 0.41E-02 0.25E-02 3.295 0.32E+00 0.46E-02 0.40E-02 0.24E-02 3.279 0.31E+00 0.48E-02 0.42E-02 0.24E-02 3.263 0.31E+00 0.52E-02 0.47E-02 0.24E-02 3.246 0.34E+00 0.63E-02 0.57E-02 0.26E-02 3.230 0.36E+00 0.76E-02 0.71E-02 0.27E-02 3.214 0.39E+00 0.88E-02 0.82E-02 0.30E-02 3.197 0.44E+00 0.96E-02 0.89E-02 0.34E-02 3.181 0.50E+00 0.10E-01 0.97E-02 0.38E-02 3.165 0.52E+00 0.11E-01 0.10E-01 0.40E-02 3.148 0.58E+00 0.13E-01 0.12E-01 0.44E-02 3.132 0.60E+00 0.16E-01 0.15E-01 0.45E-02 3.116 0.66E+00 0.23E-01 0.23E-01 0.50E-02 3.099 0.65E+00 0.49E-01 0.48E-01 0.49E-02