systematic error contributions --- proton

x systematic error x systematic error x systematic error

2.75^o

5.5^o

10.5^o total P_b P_t f e^+/π

C_1 F_2 R RC

0 0.01

0.02

0.03

0.04

10^{-2} 10^{-1}

0 0.01

0.02

0.03

10^{-2} 10^{-1}

0 0.01

0.02

0.03

10^{-2} 10^{-1}