x=0.008 x=0.015

x=0.025 x=0.035

x=0.05 x=0.08

x=0.125 x=0.175

x=0.25 x=0.35

x=0.5 x=0.75

Q^2 Μ(GeV/c)^2Ν g_1^p / F_1^p

E155 E143 SMC HERMES EMC

December 1998

Preliminary

0

0.1

1 10

0

0.1

1 10

0 0.2

1 10

0 0.2

1 10

0

0.2

1 10

0

0.2

1 10

0.2

0.4

1 10

0.2

0.4

1 10

0.25 0.5 0.75

1 10

0.25 0.5 0.75

1 10

0.5

1

1 10

0.5

1

1 10